Field 1 (170^∘)

Time = 0 ps

Time = 50 ps

Time = 100 ps

Time = 150 ps

Field 1 (170^∘)

Time = 200 ps

Time = 250 ps

Time = 300 ps

Time = 350 ps

Field 1 (170^∘)

Time = 400 ps

Time = 450 ps

Time = 500 ps

Time = 550 ps

Field 1 (170^∘)

Time = 600 ps

Time = 650 ps

Time = 700 ps

Time = 750 ps

Field 2 (190^∘)

Time = 0 ps

Time = 50 ps

Time = 100 ps

Time = 150 ps

Field 2 (190^∘)

Time = 200 ps

Time = 250 ps

Time = 300 ps

Time = 350 ps

Field 2 (190^∘)

Time = 400 ps

Time = 450 ps

Time = 500 ps

Time = 550 ps

Field 2 (190^∘)

Time = 600 ps

Time = 650 ps

Time = 700 ps

Time = 750 ps