Errata for Fitting Nature’s Basic Functions Part I:

Polynomials and Linear Least Squares

• Figure 2. The scaling for the y-axis is incorrect. The figure should be

• Equation (28) should be Rα = Q^T_1 y rather than Rα = Q_1y • Figure 4. The scaling for the y-axis is incorrect. The figure should be